Radial Velocities of four Stars

Maureen Teyssier^1 November 22, 2002

ABSTRACT

The radial velocities of four stars, HD49674, HIP21276, HIP42491, KH15D, were calculated relative to the Barycenter of our Solar System. This was accomplished with a wavelength calibration using a thorium-argon sample. A gaussian fit procedure was used to determine the center of the spectral lines on the CCD and convert them to wavelengths. Then the doppler shift equation was used to find the velocity.

The radial velocities of these stars can be found in Table. 8.

1. Introduction

Stellar spectra of the stars HD49674, HIP21276, HIP42491, KH15D were obtained from the Keck telescope. The wavelength calibration for the CCD was done with a thorium lamp over order 19, -from about 4915 to 4985 Angstroms. The spectra were analyzed in the following manner: The spectra of the stars were taken, and gaussian fits were used to find the indexes that correspond to the centers of the spectral lines. The wavelength calibration was used to convert these indices to a wavelength. The doppler shift was found using lines from the solar spectrum, and finally, a barycentric correction applied.

Star RA DEC V_{bary} (km/s) V_{mag} SP HD49674 06:51:30.4 +40:52:05 26.3881 8.10 GO HIP21276 04:33:54.23 +64:37:59.4 15.7361 8.53 GO HIP42491 08:39:44.69 +05:64:14.0 29.1651 9.18 G5 KH15D 06:41:10.18 +09:28:35.5 27.0290 15. ?

Table 1: Stellar Information

2. Data

To determine the wavelenghth of stellar spectral lines, first it was necessary to determine the wavelength that corresponds to each pixel on the CCD that recorded the data. To find this, spectra of a thorium-argon sample was compared with known wavelengths of ThAr emission lines. These known wavelengths, reported by Daryl Willmarth, Matt Cheselka, Mike Fitzpatrick and Matthew

1email: teyssier@ugastro.berkeley.edu

Rippa at NOAO,^2 were used to do wavelength calibration in a manner describe below. A gaussian procedure was used to determine the pixel location of several lines in the ThAr spectrum. The gaussian was fit over the emission lines of the gas, and the center of the gaussian was taken to be the pixel location of the emission line. The wavelength of every pixel was found by fitting a fifth-order polynomial to our pixel values and their wavelengths from NOAO. A fifth-order polynomial with coefficients represented by C_#:

λ = C_0 + C_1x + C_2x^2 + C_3x^3 + C_4x^4 + C_5x^5 (1)

The polynomial (Equation.1) gives a straight line, shown in Figure. 1. This means that the wavelength increases linearly along the index of the CCD. A cubic polynomial was fit at first, but more accuracy was desired -hence the fifth-order polynomial. It is apparent in Table .1 how much more accurate the fifth-order polynomial is. All the wavelengths are accurate to 0.001 Angstroms, and many are more accurate than that; the average error is 0.00034 Angstroms.

Pixel Values ThAr Line From New Coefficients From Old Coefficients 195.7859 4921.6134 4921.6133 4921.48 365.3357 4927.7803 4927.7802 4927.69 516.0661 4933.2091 4933.2091 4933.13 615.8228 4936.7746 4936.7739 4936.70 645.4885 4937.8295 4937.8297 4937.76 696.5669 4939.6422 4939.6427 4939.57 861.5513 4945.4587 4945.4582 4945.39 1432.1850 4965.0795 4965.0805 4965.15 1451.4920 4965.7315 4965.7306 4965.81 1959.41731 4982.4875 4982.4873 4983.16

Table 2: Calculated Thorium pixel values, wavelengths, and wavelengths given by the coefficients from a fifth-order polynomial(Column 3) and by a cubic polynomial (Column 4) for these same wavelengths. All wavelangths and in Angstroms

The solar spectra was analyzed using a gaussian fit procedure as well. This was done because it would provide more options when analyzing the stellar spectra; some of the wavelengths for absorption lines were provided, but if the wavelengths for more solar lines were known, then more stellar lines could be analyzed. Also, running the gaussian fit procedure over the solar spectra and comparing the data given by the procedure to known values gives an idea of the accuracy of the procedure. In this case, the procedure gave the same wavelength (in Angstroms) to an accuracy of the second decimal place. The error in the solar spectrum corresponds to 50 m/s.

2email:http://www.noao.edu/kpno/specatlas/thar/thar.html

Fig. 1.— The fitted polynomial correlating pixel values to wavelengths.

Coefficients C_0 = 4914.4150 C_1 = 0.036972006 C_2 = -1.0325557e-06 C_3 = -1.0143220e-10 C_4 = 4.9759025e-14 C_5 = -1.3065483e-17

Table 3: The coefficients for the fifth-order polynomial.

The stellar spectra of the four stars were then analyzed using the gaussian fit procedure. Due to the nature of the lines, and the program, not all of the lines would give good index values. 7 to 10 lines were analyzed per spectrum. The first three stars are G-type stars, so the solar spectrum can be used to calculate the doppler shift. The spectral type of KH15D is unknown, but in this lab, the stellar spectra was used to moderate success. A plot of the stellar spectra against the sprectra of KH15D shows that it is close enough for analysis, but few lines could be analyzed. This spectrum was problematic. There were erroneous pixel values created by broken pixels in the CCD. These were replaced with the average value of the spectrum and avoided during analysis. If I had been cross-correlating the stellar spectrum with the solar spectrum, I would have needed to generate random noise that had an average value that was the same as the spectra and replaced the bad pixel values with that. This would have been necessary for a cross-correlation so that I did not accidentally create a flat space that matched up with an area in the solar spectrum, resulting in a ’mis-alignment’ of the spectra. Because I did not end up using cross-correlation, this was not necessary. For this particular spectrum, a gaussian fit, a polnomial and a wieghted polynomial were tried over all the lines that looked like they were doppler shifted spectral lines. Attempts over three lines wer successful. Four more lines were examined by eye, basically by zooming in on the peak until it could be estimated, to a decimal place, where the center of the line was.

The doppler shift was found by subtracting the wavelengths for the corresponding spectral lines in the solar spectrum. The velocity of the star was found using the doppler equation: v c = Δλ λ_{rest} (2) The uncertainty is reported using poisson statistics in all of the tables in this paper.

Solar λ(Å) Pixel Value λ(Å) Δλ(Å) V_{rad} (km/s) 4927.4225 349.25857 4927.1982 -0.22419765 12.747 4927.8737 361.34840 4927.6359 -0.23762367 11.931 4930.3155 428.42804 4930.0588 -0.25662339 10.783 4938.8195 666.54810 4938.5779 -0.24142418 11.733 4939.2425 678.41552 4938.9991 -0.24355548 11.605 4939.6912 691.08820 4939.4486 -0.24285260 11.649 4942.4828 770.57086 4942.2590 -0.22390912 12.806 4950.1118 987.85428 4949.8676 -0.24419660 11.598 4953.2132 1077.27932 4952.9671 -0.24628981 11.481 4962.5760 1350.96496 4962.3352 -0.24097868 11.830 Mean V_{rad} (km/s) σ σ_{mean} 11.8168 0.593123 0.187562

Table 4: Data for HD4967: Δλ is calculated by subtracting the third column form the first, and the velocity is given with respect to the center of our solar system.

Solar λ(Å) Pixel Value λ(Å) Δλ(Å) V_{rad} (km/s) 4927.4225 351.73539 4927.2879 -0.13449170 7.553 4927.8737 363.91958 4927.7290 -0.14456936 6.940 4930.3155 431.12722 4930.1561 -0.15933971 6.047 4938.8195 669.15443 4938.6704 -0.14889086 6.698 4939.2425 681.08190 4939.0937 -0.14896235 6.694 4939.6912 693.74707 4939.5428 -0.14860279 6.717 4942.4828 773.16185 4942.3504 -0.13253721 7.696 4950.1118 990.51682 4949.9602 -0.15164264 6.552 4953.2132 1080.04081 4953.0625 -0.15087613 6.604 4962.5760 1353.75309 4962.4297 -0.14647240 6.887 Mean V_{rad} (km/s) σ σ_{mean} 6.83921 0.480588 0.151975

Table 5: Data for HIP21276: Δλ is calculated by subtracting the third column form the first, and the velocity is given with respect to the center of our solar system.

Solar λ(Å) Pixel Value λ(Å) Δλ(Å) V_{rad} (km/s) 4927.4225 333.40578 4926.6237 -0.79868174 -19.428 4927.8737 345.51640 4927.0626 -0.81093133 -20.168 4930.3155 412.70471 4929.4918 -0.82364474 -20.917 4938.8195 650.37553 4938.0034 -0.81595087 -20.364 4939.2425 612.24847 4938.4252 -0.81744902 -20.450 4939.6912 674.92793 4938.8754 -0.81603766 -20.367 4942.4828 754.23201 4941.6825 -0.80045573 -19.387 4950.1118 971.27735 4949.2910 -0.82081040 -20.545 4953.2132 1060.59128 4952.3901 -0.82327114 -20.663 4962.5760 1333.92861 4961.7573 -0.81886392 -20.303 Mean V_{rad} (km/s) σ σ_{mean} -20.2597 0.494264 0.156300

Table 6: Data for HIP42491: Δλ is calculated by subtracting the third column form the first, and the velocity is given with respect to the center of our solar system.

Solar λ(Å) Pixel Value λ(Å) Δλ(Å) V_{rad} (km/s) 4927.8737 368.013 4927.8771 -0.013547056 27.244788 4937.3499 631.5 4937.3321 -0.018017203 25.935007 4938.8195 672.75 4938.7981 -0.021261018 25.738429 4939.2425 684.973 4939.2317 -0.010949539 26.364406 4950.1118 993.6 4950.0673 -0.044488901 24.334628 4957.3086 1202.3 4957.2687 -0.039892486 24.616507 Mean V_{rad} (km/s) σ σ_{mean} 25.7056 1.08835 0.344166

Table 7: Data for KH15D:Δλ is calculated by subtracting the third column form the first, and the velocity is given with respect to the center of our solar system.

Radial Velocities HD49674 11.817 ± 0.189 HIP21276 6.839 ± 0.152 HIP42491 -20.260 ± 0.156 KH15D 25.706 ± 0.344

Table 8:

3. Interpretatons

The radial velocities for the four stars are found in Table. 8. These results are very pleasing, and the best that can be hoped for with this method. For higher accuracy, a cross-correlation of the solar spectra with the stellar spectra should be done.

The analysis of the thorium-argon sample ended up being the area of this project where the most care was necessary. A polynomial was used to determine the wavelength calibration. The coefficients of this polynomial were created by correllating the pixel values of the thorium-argon spectral lines to their known laboratory values. If these coefficients were even slightly off, it resulted in the introduction of a huge error to the radial velocity.

Error in the coefficients could be introduced by mismatching a line value to what looks like a single spectral line, but which is actually a double line. The sample of ThAr used by the NOAO research group produced lines with slightly different intensities than the sample from the Keck telescope. If, during the analysis to find the center of the ThAr spectral lines, a double line was chosen that looked like a single line, and the intensity of the two peaks had shifted, then the center of one line could be matched with the wavelength of the other. This would throw the coefficients slightly off, -but off enough to change the final velocity determined for the star. I believe this is what happened with the first set of coefficients that were used to determine wavelengths and finally, the velocities of stars.

Error was also introduced by a poor gaussian fit. This was not so much the case for the thorium lines, which gave very good fits. The gaussian procedure used over the spectral lines of the four stars returned plot of the spectral line with the gaussian fit plotted over it, as well as the doppler shift and the barycentric velocity. This made it easy to visually check the gaussian fit, and see that even a slightly poor fit gave a velocity that had a greater standard deviation from the mean than the rest of the data set. There were a few lines that were poor fits for three of the stars. One of these lines was such a poor fit that it was thrown out. The rest were kept. During initial analysis, the procedure that was run did not plot out the spectral line, and it’s gaussian. Instead, the line thickness returned by the gaussfit procedure was used to check the fit and make sure it was not a double line. After performing the analysis again, I believe that this information is good to have, but is not good enough to give the kind of accurate results desired.

The uncertainty is calculated using poisson statistics in all of the tables in this paper. The errors in the radial velocities, see Table. 8, seemed very low. So, in order to gauge the accuracy of these errors, I went back to the wavelength calibration. The average residual was .00034 Angstroms. This was divided by the average wavelength and multiplied by the speed of light to get an approximate error in km/s. The error was 0.02 km/s, which is smaller than the error in the solar spectrum, which is 0.05 km/s. It appears that the error was introduced through the use of a gaussian.