20020827076o-B8.fits - M31, R

200 400 600 800 1000 0

200

400

600

800

1000

0 56 103 149 197 244

z1=0.00 z2=7370.79 ztrans=linear Con=0.91 Brt=0.50 cmap=Grayscale ncolors=201

NOAO/IRAF arlin@rusticana.phys.columbia.edu Fri Oct 18 14:29:43 2002